function GENETIC-ALGORITHM( population, FITNESS-FN) returns an individual inputs: population, a set of individuals

FITNESS-FN, a function that measures the fitness of an individual

repeat

parents SELECTION( population, FITNESS-FN) population REPRODUCTION( parents) until some individual is fit enough return the best individual in population, according to FITNESS-FN