The

Connection Machine

System

Thinking Machines Corporation

Cambridge, Massachusetts

CMMD Reference Manual

Version 3.0

May 1993

Copyright { 1993 by Thinking Machines Corporation. All rights reserved.

Thinking Machines Corporation

245 First Street

Cambridge, Massachusetts 02142 –1264

(617) 234 –1000

******************************************************************************

The information in this document is subject to change without notice and should not be construed as a

commitment by Thinking Machines Corporation. Thinking Machines reserves the right to make changes to any

product described herein.

Although the information in this document has been reviewed and is believed to be reliable, Thinking Machines

Corporation assumes no liability for errors in this document. Thinking Machines does not assume any liability

arising from the application or use of any information or product described herein.

******************************************************************************

Connection Machine

[

is a registered trademark of Thinking Machines Corporation.

CM , CM-1 , CM-2 , CM-200, and DataVault are trademarks of Thinking Machines Corporation.

CM-5 and CM-5 Scale 3 are trademarks of Thinking Machines Corporation.

CM OST is a trademark of Thinking Machines Corporation.

CM Fortran is a trademark of Thinking Machines Corporation.

Thinking Machines

[

is a registered trademark of Thinking Machines Corporation.

NFS is a trademark of Sun Microsystems, Inc.

UNIX is a registered trademark of UNIX System Laboratories, Inc.

Ethernet is a trademark of Xerox Corporation.

First printing, May 1993